PLATE 003+02.2* IRAS17414-2412

003−02.4* KnFs 4

003−03.2 KnFs 7

003+02.2* C IRAS17414-2412

003−02.4* C KnFs 4

003−03.2 C KnFs 7

PLATE 003−04.11 KnFs 12

003−07.1 KnFs 19

004+02.2 IRAS17445-2412

003−06.2 ID SB 7

004+06.3* G 4.4+6.4

004+02.2 C IRAS17445-2412

PLATE 004−03.2 KnFs 10

004−03.3 KnFs 11

004−05.2* He 2-376

004−03.2 C KnFs 10

004−03.3 C KnFs 11

004−05.2* C He 2-376

PLATE 004−05.6 ID SB 8

004−09.1 SB 9

005+02.2 C K 5-19

004−05.7 ID SB 10

005+02.2 K 5-19

005−01.1 IRAS18023-2513

PLATE 005−02.2* ID MaC 1-10

005−03.3 KnFs 13

005−04.2 KnFs 16

005−02.2* C ID MaC 1-10

005−03.3 C KnFs 13

005−04.2 C KnFs 16