PLATE 265−04.1 ESO-259-10

270+24.1 K 1-28

272−05.1 MmWe 1-1

267−03.1* Sa 3-7

270−02.1 PN 0857-5011

273+06.1* HBDS 1

PLATE 274+09.1 Lo 4

275−01.2 NeVe 3-1

277−01.1 PN 0936-5413

274+02.1* He 2-34

277+03.1* MmWe 2-2

277−03.2* VBRC 2

PLATE 279−00.1* IRAS09517-5438

280+02.1 SM 1

282−00.1* IRAS10115-5640

279−03.2 VBRC 3

280+01.1 KLSS 1-12

283+25.1 K 1-22

PLATE 283+09.1* ESO-215-04

284−05.1* SP 1-1

285−02.2* He 3-401

283−01.2 MmWe 1-2

285+01.1 He 2-52

286+11.1 Lo 5

PLATE 286−06.2 WRA 17-40

288+08.1* ESO-216-02

288−00.1* Hf 39

286−29.1 K 1-27

288+00.2* ESO-128-25

289+10.1* Y-C 13