PLATE 326−01.2 VB 3

327−05.1 KsRm 1

328−01.1* PN 1557-5445

326−01.2 C VB 3

328+01.1 Lo 10

329+01.1 VBRC 7

PLATE 329−02.3 HeFa 1

330+04.2 Sa 2-125

331+03.1* Sa 2-128

330+05.1 Lo 9

330−02.2* Sa 1-4

331+01.1* PN 1600-5041

PLATE 331−12.1 CPD-59 6926

332+03.1* Sa 3-32

332−09.1* CPD-56 8032

331−13.1* SKWL 2-48

332+01.1* Sa 3-33

332−16.1 HtTr 6

PLATE 332−16.2* HtTr 7

334−01.1 MmWe 1-6

335+12.1* DS 2

333−04.1 HtTr 3

334−07.1* CPD-53 8315

335+09.1 ESO-330-02

PLATE 335−03.1 HtTr 4

335−04.1 MmWe 1-8

336+04.1 PN 1611-4504

335−03.2 MmWe 1-7

336+08.1 SKWL 4-10

336−01.1* VERA 90