PLATE 345+15.1 Lo 13

345−13.1* SKWL 2-37

347+03.1* Vd 1-7

096 345−10.1 MmWe 1-11

346+14.1* KLSS 1-14

347−02.1* IRAS17211-4049

PLATE 347−06.1 SB 31

348+04.1 KLSS 1-15

349−09.1 SB 32

348+06.1 IRAS16455-3455

349−04.1 Lo 16

350+07.1* IRAS16478-3217

PLATE 351−01.1 Sa 2-215

351−06.3 ID SB 34

351−10.1 ID SKWL 2-28

351−06.2 ID SB 33

351−06.4 SB 35

351−10.2 HtTr 9

PLATE 352+11.2* K 2-16

352−06.1 SB 36

353+08.1* MyCn 26

099 352−04.2 SB 37

352−08.1 SB 38

353+02.1* IRAS17164-3226

PLATE 353−01.1* K 6-3

353−02.2 K 5-8

353−03.1* IRAS17393-3612

353−02.1* IRAS17373-3542

353−02.2 C K 5-8

353−03.2* K 6-11