PLATE 353−04.2* K 6-13

353−05.2 JaFu 2

353−08.1 SB 39

353−04.2* C K 6-13

353−05.2 C JaFu 2

353−12.1 WRA 16-411

PLATE 354+06.1* Ta 48

354+05.1* IRAS17084-3025

354+04.3 C Ta 233

354+06.1* C Ta 48

354+04.3 Ta 233

354+04.4 Ta 139

PLATE 354−01.1* K 6-5

354−10.1 SB 41

355+04.2 Ta 140

354−07.2 SB 40

355+04.1* Sa 3-43

355+03.4 Ta 137

PLATE 355+02.4 Ta 138

355−01.2* K 6-9

355−03.4 K 5-18

104 355−01.1* IRAS17372-3328

355−01.2* C K 6-9

355−03.4 C K 5-18

PLATE 355−07.1 SB 42

356−00.1* Th 3-34

356−02.3* K 6-12

355−08.1 ID SB 43

356−01.1 TaJu 23

356−06.3 SB 48