PLATE 356−03.5 K 5-20

356−07.3 ID SB 44

356−07.5 ID SB 47

356−03.5 C K 5-20

356−07.4 SB 45

356−08.1 SB 46

PLATE 356−11.1 Lo 17

357+07.2 TaJu 5

357+04.2 TaJu 18

356−11.1 C Lo 17

357+05.1* TaJu 13

357+04.3* Ta 68

PLATE 357+03.6* Ta 69

357+02.5 C M 4-4

357+01.2 C Ae 2-H

357+02.5 M 4-4

357+01.2 Ae 2-H

357+01.3* TaJu 21

PLATE 357+01.4* K 6-2

357−04.3 H 1-43

357−07.1 ID SB 51

357+01.4* C K 6-2

357−06.2 ID SB 50

357−09.1 SB 49

PLATE 358+09.1 Th 3-1

358+08.1* Ta 29

358+06.1* TaJu 14

358+09.2* Ta 26

358+07.2 TaJu 8

358+04.3 ID SrWe 2