PLATE 000−08.1 ID SB 1

001+03.1 K 5-5

001+02.2 C K 5-10

001+05.1 H 1-14

001+02.2 K 5-10

001+01.2 K 6-10

PLATE 001+01.3 JaSt 39

001+01.5 ID JaSt 52

001+00.2 JaSt 51

001+01.4 JaSt 43

001+01.6 JaSt 49

001+00.3 ID JaSt 53

PLATE 001+00.4 ID JaSt 60

001−00.5 JaSt 77

001−01.4 Sa 3-92

008 001−00.4 K 6-17

001−00.6 ID JaSt 78

001−01.5 JaSt 92

PLATE 001−01.6 JaSt 86

001−02.2 C Sa 3-104

001−03.3 C SAWI 1

001−02.2 Sa 3-104

001−03.3 SAWI 1

001−03.5* SAWI 3

PLATE 001−03.4* SAWI 2

001−03.6* SAWI 4

001−03.7 SAWI 5

001−03.4* C SAWI 2

001−03.6* C SAWI 4

001−03.7 C SAWI 5