PLATE 037−34.1 NGC 7009

038−00.1* HtTr 12

041+01.1* PN 1858+0821

038+07.1* K 1-25

039−02.2* PN 1908+0422

041−00.1* HtTr 14

PLATE 043+02.1 CTSS 1

044+05.2 CTSS 2

044−00.1 AGPF 2

044+10.1* We 3-1

044+00.1 AGPF 1

046+03.1 Sh 2-78

PLATE 046+02.1 CTSS 4

047+01.1 PN 1909+1326

049+02.2* PN 1911+1534

038 046−01.1* ID PN 1920+1122

048−01.1* DeHt 4

050+19.1 IRAS18062+2410

PLATE 051+02.1 IRAS19127+1717

051+00.1 KLW 1

053+01.1* KLSS 1-1

039 051+01.1* IRAS19170+1706

052+50.1* BD+33 2642

053−02.1 WiOl 1

PLATE 055+01.1 KLSS 1-2

058−05.1 WeSb 5

059−01.1 He 1-3

058+09.1 Si 1-2

059−00.2 PN 1943+2251

059−01.2 We 1-8